From f54fcda887531f4677e213e09f8de4df744e4bee Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Fri, 12 Aug 2022 01:22:00 +0300
Subject: band-aid to prevent misclics on logout

---
 src/components/search_bar/search_bar.vue | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/components/search_bar/search_bar.vue')

diff --git a/src/components/search_bar/search_bar.vue b/src/components/search_bar/search_bar.vue
index 222f57ba..14842835 100644
--- a/src/components/search_bar/search_bar.vue
+++ b/src/components/search_bar/search_bar.vue
@@ -47,6 +47,8 @@
           class="cancel-icon fa-scale-110 fa-old-padding"
         />
       </button>
+      <span class="spacer"/>
+      <span class="spacer"/>
     </template>
   </div>
 </template>
-- 
cgit v1.2.3-70-g09d2

