From 1ec41302f729ac9100c3ec0cede5e4f79dd626a3 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 21 Oct 2020 00:28:24 +0300
Subject: rotate the shackle of the lock for better accessibility

---
 src/components/scope_selector/scope_selector.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/scope_selector/scope_selector.vue')

diff --git a/src/components/scope_selector/scope_selector.vue b/src/components/scope_selector/scope_selector.vue
index c098783d..d490f8ee 100644
--- a/src/components/scope_selector/scope_selector.vue
+++ b/src/components/scope_selector/scope_selector.vue
@@ -28,7 +28,7 @@
       :title="$t('post_status.scope.unlisted')"
       @click="changeVis('unlisted')"
       >
-      <FAIcon icon="unlock" class="button-icon" size="lg" />
+      <FAIcon icon="lock-open" class="button-icon" size="lg" />
     </span>
     <span
       v-if="showPublic"
-- 
cgit v1.2.3-70-g09d2

