From e594252668256197d9b68f1db1f7108c5255d275 Mon Sep 17 00:00:00 2001
From: Ilja <ilja@ilja.space>
Date: Mon, 21 Mar 2022 09:59:52 +0100
Subject: clean up leftover

There was a comment to enable something for eslint. This was a leftover from when it was dissabled.
But the dissabling was removed in a privious commit f9393b0dab22279e9bdb97a1cf52fecfe278a4a7
---
 src/components/report/report.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/components/report/report.vue')

diff --git a/src/components/report/report.vue b/src/components/report/report.vue
index 1dc73203..1f19cc25 100644
--- a/src/components/report/report.vue
+++ b/src/components/report/report.vue
@@ -35,7 +35,6 @@
     />
     <div v-if="report.statuses.length">
       <small>{{ $t('report.reported_statuses') }}</small>
-      <!-- eslint-enable vue/no-v-html -->
       <router-link
         v-for="status in report.statuses"
         :key="status.id"
-- 
cgit v1.2.3-70-g09d2

