From b6cf2bcefd5ddd20c11ee4b0d0f94e29e8f59c40 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 28 Oct 2020 21:31:16 +0200
Subject: improved the semantics for our icon scale, fixed preview, fixed
 navbar desktop

---
 src/components/reply_button/reply_button.vue | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'src/components/reply_button/reply_button.vue')

diff --git a/src/components/reply_button/reply_button.vue b/src/components/reply_button/reply_button.vue
index ae7b0e26..a0ac8941 100644
--- a/src/components/reply_button/reply_button.vue
+++ b/src/components/reply_button/reply_button.vue
@@ -2,9 +2,8 @@
   <div>
     <FAIcon
       v-if="loggedIn"
-      class="ReplyButton button-icon -interactive"
+      class="ReplyButton fa-scale-110 fa-old-padding -interactive"
       icon="reply"
-      size="lg"
       :title="$t('tool_tip.reply')"
       :class="{'-active': replying}"
       @click.prevent="$emit('toggle')"
@@ -12,8 +11,7 @@
     <FAIcon
       v-else
       icon="reply"
-      size="lg"
-      class="ReplyButton button-icon"
+      class="ReplyButton fa-scale-110 fa-old-padding"
       :title="$t('tool_tip.reply')"
     />
     <span v-if="status.replies_count > 0">
-- 
cgit v1.2.3-70-g09d2

