From c7e9f21da0eb035b73a165e16f77a9cd18036305 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Thu, 2 Jan 2020 22:44:54 +0200
Subject: color input and opacity input now use Checkbox component. Cleanup.

---
 src/components/range_input/range_input.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/range_input/range_input.vue')

diff --git a/src/components/range_input/range_input.vue b/src/components/range_input/range_input.vue
index aaa2ed26..5857a5c1 100644
--- a/src/components/range_input/range_input.vue
+++ b/src/components/range_input/range_input.vue
@@ -12,7 +12,7 @@
     <input
       v-if="typeof fallback !== 'undefined'"
       :id="name + '-o'"
-      class="opt exclude-disabled"
+      class="opt"
       type="checkbox"
       :checked="present"
       @input="$emit('input', !present ? fallback : undefined)"
-- 
cgit v1.2.3-70-g09d2

