From 78ced0c901d255bf99e096339da945b1b3cc0216 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Tue, 21 Jun 2022 01:05:42 +0300
Subject: proper horizontal limit

---
 src/components/popover/popover.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/popover/popover.vue')

diff --git a/src/components/popover/popover.vue b/src/components/popover/popover.vue
index 5c45be73..0d37328e 100644
--- a/src/components/popover/popover.vue
+++ b/src/components/popover/popover.vue
@@ -46,7 +46,7 @@
   z-index: 90000;
   position: fixed;
   min-width: 0;
-  max-width: 90vw;
+  max-width: calc(100vw - 20px);
   box-shadow: 2px 2px 3px rgba(0, 0, 0, 0.5);
   box-shadow: var(--popupShadow);
 }
-- 
cgit v1.2.3-70-g09d2

