From 631b8b93a4a8dd548bae5ab9fa7bc4d6e892ae3f Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 20 Apr 2022 19:44:31 +0300
Subject: tons of fixes mainly aimed at panel headings

---
 src/components/popover/popover.vue | 12 ++++++++----
 1 file changed, 8 insertions(+), 4 deletions(-)

(limited to 'src/components/popover/popover.vue')

diff --git a/src/components/popover/popover.vue b/src/components/popover/popover.vue
index 044b887d..0350daa1 100644
--- a/src/components/popover/popover.vue
+++ b/src/components/popover/popover.vue
@@ -93,7 +93,7 @@
 
   .dropdown-item {
     line-height: 21px;
-    overflow: auto;
+    overflow: hidden;
     display: block;
     padding: 0.25em 0.75em;
     clear: both;
@@ -154,9 +154,13 @@
         content: '✓';
       }
 
-      &.menu-checkbox-radio::after {
-        font-size: 2em;
-        content: '•';
+      &.-radio {
+        border-radius: 9999px;
+
+        &.menu-checkbox-checked::after {
+          font-size: 2em;
+          content: '•';
+        }
       }
     }
 
-- 
cgit v1.2.3-70-g09d2

