From 7b99d98c553f40ec4d633d0d4fdf65f275c80e77 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Tue, 24 Nov 2020 12:32:42 +0200
Subject: Replace all use of <a> + href='#' with proper buttons

---
 src/components/poll/poll.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/poll/poll.vue')

diff --git a/src/components/poll/poll.vue b/src/components/poll/poll.vue
index 5f54b416..264a5f03 100644
--- a/src/components/poll/poll.vue
+++ b/src/components/poll/poll.vue
@@ -49,7 +49,7 @@
     <div class="footer faint">
       <button
         v-if="!showResults"
-        class="btn btn-default poll-vote-button"
+        class="btn button-default poll-vote-button"
         type="button"
         :disabled="isDisabled"
         @click="vote"
-- 
cgit v1.2.3-70-g09d2

