From bc029b0fa2499651a7ff541f09afe1fbc2e19cea Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Tue, 29 Mar 2022 19:04:01 +0300
Subject: fix spacing in poll expiration label

---
 src/components/poll/poll.vue | 22 ++++++++++++----------
 1 file changed, 12 insertions(+), 10 deletions(-)

(limited to 'src/components/poll/poll.vue')

diff --git a/src/components/poll/poll.vue b/src/components/poll/poll.vue
index 9e37a9d7..f6b12a54 100644
--- a/src/components/poll/poll.vue
+++ b/src/components/poll/poll.vue
@@ -71,16 +71,18 @@
           {{ $tc("polls.votes_count", poll.votes_count, { count: poll.votes_count }) }}&nbsp;·&nbsp;
         </template>
       </div>
-      <i18n-t
-        scope="global"
-        :keypath="expired ? 'polls.expired' : 'polls.expires_in'"
-      >
-        <Timeago
-          :time="expiresAt"
-          :auto-update="60"
-          :now-threshold="0"
-        />
-      </i18n-t>
+      <span>
+        <i18n-t
+          scope="global"
+          :keypath="expired ? 'polls.expired' : 'polls.expires_in'"
+        >
+          <Timeago
+            :time="expiresAt"
+            :auto-update="60"
+            :now-threshold="0"
+          />
+        </i18n-t>
+      </span>
     </div>
   </div>
 </template>
-- 
cgit v1.2.3-70-g09d2

