From 33d92f9b16267415d1e62285a4f305ae10baf489 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 20 Apr 2022 23:55:34 +0300
Subject: relative units in line-height + some cleanup

---
 src/components/password_reset/password_reset.vue | 7 ++++---
 1 file changed, 4 insertions(+), 3 deletions(-)

(limited to 'src/components/password_reset/password_reset.vue')

diff --git a/src/components/password_reset/password_reset.vue b/src/components/password_reset/password_reset.vue
index e0579568..90673f44 100644
--- a/src/components/password_reset/password_reset.vue
+++ b/src/components/password_reset/password_reset.vue
@@ -91,6 +91,7 @@
     flex-direction: column;
     margin-top: 0.6em;
     max-width: 18rem;
+
     > * {
       min-width: 0;
     }
@@ -100,8 +101,8 @@
     display: flex;
     flex-direction: column;
     margin-bottom: 1em;
-    padding: 0.3em 0.0em 0.3em;
-    line-height: 24px;
+    padding: 0.3em 0;
+    line-height: 1.85em;
   }
 
   .error {
@@ -113,7 +114,7 @@
 
   .alert {
     padding: 0.5em;
-    margin: 0.3em 0.0em 1em;
+    margin: 0.3em 0 1em;
   }
 
   .password-reset-required {
-- 
cgit v1.2.3-70-g09d2

