From f561e755530063b2e8e0db210264b1d244543bd0 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 21 Oct 2020 00:31:16 +0300
Subject: lint

---
 src/components/panel_loading/panel_loading.vue | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'src/components/panel_loading/panel_loading.vue')

diff --git a/src/components/panel_loading/panel_loading.vue b/src/components/panel_loading/panel_loading.vue
index 9bf3ab32..b15e7d38 100644
--- a/src/components/panel_loading/panel_loading.vue
+++ b/src/components/panel_loading/panel_loading.vue
@@ -1,7 +1,11 @@
 <template>
   <div class="panel-loading">
     <span class="loading-text">
-      <FAIcon icon="circle-notch" spin size="3x"/>
+      <FAIcon
+        icon="circle-notch"
+        spin
+        size="3x"
+      />
       {{ $t('general.loading') }}
     </span>
   </div>
-- 
cgit v1.2.3-70-g09d2

