From b97db4912dacca3cfcf91fc0843e631666a47d1c Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 20 Aug 2018 20:45:54 +0300
Subject: error display

---
 src/components/notifications/notifications.vue | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'src/components/notifications/notifications.vue')

diff --git a/src/components/notifications/notifications.vue b/src/components/notifications/notifications.vue
index 859730ed..a0b0e5f5 100644
--- a/src/components/notifications/notifications.vue
+++ b/src/components/notifications/notifications.vue
@@ -3,7 +3,10 @@
     <div class="panel panel-default">
       <div class="panel-heading">
         <span class="unseen-count" v-if="unseenCount">{{unseenCount}}</span>
-        {{$t('notifications.notifications')}}
+        <div class="title"> {{$t('notifications.notifications')}}</div>
+        <div @click.prevent class="loadmore-error alert error" v-if="error">
+          {{$t('timeline.error_fetching')}}
+        </div>
         <button v-if="unseenCount" @click.prevent="markAsSeen" class="read-button">{{$t('notifications.read')}}</button>
       </div>
       <div class="panel-body">
-- 
cgit v1.2.3-70-g09d2

