From 07354cc45d0399d0465194700454b66e14ce41bb Mon Sep 17 00:00:00 2001
From: eal <eal@waifu.club>
Date: Thu, 7 Dec 2017 23:54:03 +0200
Subject: Don't show "read" button if there are no new notifications.

---
 src/components/notifications/notifications.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/notifications/notifications.vue')

diff --git a/src/components/notifications/notifications.vue b/src/components/notifications/notifications.vue
index 176695b1..b341fcef 100644
--- a/src/components/notifications/notifications.vue
+++ b/src/components/notifications/notifications.vue
@@ -4,7 +4,7 @@
       <div class="panel-heading base02-background base04">
         <span class="unseen-count" v-if="unseenCount">{{unseenCount}}</span>
         {{$t('notifications.notifications')}}
-        <button @click.prevent="markAsSeen" class="base04 base02-background read-button">{{$t('notifications.read')}}</button>
+        <button v-if="unseenCount" @click.prevent="markAsSeen" class="base04 base02-background read-button">{{$t('notifications.read')}}</button>
       </div>
       <div class="panel-body base03-border">
         <div v-for="notification in visibleNotifications" :key="notification" class="notification" :class='{"unseen": !notification.seen}'>
-- 
cgit v1.2.3-70-g09d2

