From b6cf2bcefd5ddd20c11ee4b0d0f94e29e8f59c40 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 28 Oct 2020 21:31:16 +0200
Subject: improved the semantics for our icon scale, fixed preview, fixed
 navbar desktop

---
 src/components/notification/notification.vue | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'src/components/notification/notification.vue')

diff --git a/src/components/notification/notification.vue b/src/components/notification/notification.vue
index b609ae04..2bbde108 100644
--- a/src/components/notification/notification.vue
+++ b/src/components/notification/notification.vue
@@ -19,7 +19,7 @@
         class="unmute"
         @click.prevent="toggleMute"
       ><FAIcon
-        class="button-icon"
+        class="fa-scale-110 fa-old-padding"
         icon="eye-slash"
       /></a>
     </div>
@@ -137,7 +137,7 @@
             href="#"
             @click.prevent="toggleMute"
           ><FAIcon
-            class="button-icon"
+            class="fa-scale-110 fa-old-padding"
             icon="eye-slash"
           /></a>
         </span>
@@ -157,13 +157,13 @@
           >
             <FAIcon
               icon="check"
-              class="button-icon follow-request-accept"
+              class="fa-scale-110 fa-old-padding follow-request-accept"
               :title="$t('tool_tip.accept_follow_request')"
               @click="approveUser()"
             />
             <FAIcon
               icon="times"
-              class="button-icon follow-request-reject"
+              class="fa-scale-110 fa-old-padding follow-request-reject"
               :title="$t('tool_tip.reject_follow_request')"
               @click="denyUser()"
             />
-- 
cgit v1.2.3-70-g09d2

