From 4bbc3ada5d12cfd1dbccbdcb081246b00735452a Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sun, 8 Apr 2018 14:45:12 +0300
Subject: fix some incorrect radii

---
 src/components/nav_panel/nav_panel.vue | 12 ++++++++----
 1 file changed, 8 insertions(+), 4 deletions(-)

(limited to 'src/components/nav_panel/nav_panel.vue')

diff --git a/src/components/nav_panel/nav_panel.vue b/src/components/nav_panel/nav_panel.vue
index 04ac5738..5db3f555 100644
--- a/src/components/nav_panel/nav_panel.vue
+++ b/src/components/nav_panel/nav_panel.vue
@@ -47,13 +47,17 @@
   padding: 0;
 
   &:first-child a {
-    border-top-right-radius: 10px;
-    border-top-left-radius: 10px;
+    border-top-right-radius: $fallback--panelRadius;
+    border-top-right-radius: var(--panelRadius, $fallback--panelRadius);
+    border-top-left-radius: $fallback--panelRadius;
+    border-top-left-radius: var(--panelRadius, $fallback--panelRadius);
   }
 
   &:last-child a {
-    border-bottom-right-radius: 10px;
-    border-bottom-left-radius: 10px;
+    border-bottom-right-radius: $fallback--panelRadius;
+    border-bottom-right-radius: var(--panelRadius, $fallback--panelRadius);
+    border-bottom-left-radius: $fallback--panelRadius;
+    border-bottom-left-radius: var(--panelRadius, $fallback--panelRadius);
   }
 }
 
-- 
cgit v1.2.3-70-g09d2

