From 075f2cb903fa45ea8e7a52098fd7091b0b14a9fd Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 4 Mar 2024 19:45:42 +0200
Subject: remove all "fallback variables"

---
 src/components/mrf_transparency_panel/mrf_transparency_panel.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/components/mrf_transparency_panel/mrf_transparency_panel.vue')

diff --git a/src/components/mrf_transparency_panel/mrf_transparency_panel.vue b/src/components/mrf_transparency_panel/mrf_transparency_panel.vue
index 97af4787..6dc86738 100644
--- a/src/components/mrf_transparency_panel/mrf_transparency_panel.vue
+++ b/src/components/mrf_transparency_panel/mrf_transparency_panel.vue
@@ -227,6 +227,5 @@
 <script src="./mrf_transparency_panel.js"></script>
 
 <style lang="scss">
-@import "../../variables";
 @import "./mrf_transparency_panel";
 </style>
-- 
cgit v1.2.3-70-g09d2

