From 6c7eeb93fef28789a4d560be7feaeccc19d6ed20 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 27 May 2019 00:13:08 +0300
Subject: move drowdown menu to popper

---
 .../moderation_tools/moderation_tools.vue          | 58 ----------------------
 1 file changed, 58 deletions(-)

(limited to 'src/components/moderation_tools/moderation_tools.vue')

diff --git a/src/components/moderation_tools/moderation_tools.vue b/src/components/moderation_tools/moderation_tools.vue
index c9e3fc78..146673a5 100644
--- a/src/components/moderation_tools/moderation_tools.vue
+++ b/src/components/moderation_tools/moderation_tools.vue
@@ -86,64 +86,6 @@
 @import '../../_variables.scss';
 @import '../popper/popper.scss';
 
-.dropdown-menu {
-  display: block;
-  padding: .5rem 0;
-  font-size: 1rem;
-  text-align: left;
-  list-style: none;
-  max-width: 100vw;
-  z-index: 10;
-  box-shadow: 1px 1px 4px rgba(0,0,0,.6);
-  box-shadow: var(--panelShadow);
-  border: none;
-  border-radius: $fallback--btnRadius;
-  border-radius: var(--btnRadius, $fallback--btnRadius);
-  background-color: $fallback--bg;
-  background-color: var(--bg, $fallback--bg);
-
-  .dropdown-divider {
-    height: 0;
-    margin: .5rem 0;
-    overflow: hidden;
-    border-top: 1px solid $fallback--border;
-    border-top: 1px solid var(--border, $fallback--border);
-  }
-
-  .dropdown-item {
-    line-height: 21px;
-    margin-right: 5px;
-    overflow: auto;
-    display: block;
-    padding: .25rem 1.0rem .25rem 1.5rem;
-    clear: both;
-    font-weight: 400;
-    text-align: inherit;
-    white-space: normal;
-    border: none;
-    border-radius: 0px;
-    background-color: transparent;
-    box-shadow: none;
-    width: 100%;
-    height: 100%;
-
-    &-icon {
-      padding-left: 0.5rem;
-
-      i {
-        margin-right: 0.25rem;
-      }
-    }
-
-    &:hover {
-      // TODO: improve the look on breeze themes
-      background-color: $fallback--fg;
-      background-color: var(--btn, $fallback--fg);
-      box-shadow: none;
-    }
-  }
-}
-
 .menu-checkbox {
   float: right;
   min-width: 22px;
-- 
cgit v1.2.3-70-g09d2

