From a302ec1f087a1203772ee605a33b535dbf26fd06 Mon Sep 17 00:00:00 2001
From: taehoon <th.dev91@gmail.com>
Date: Fri, 18 Oct 2019 11:57:54 -0400
Subject: fix eslint warnings

---
 src/components/modal/modal.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/modal/modal.vue')

diff --git a/src/components/modal/modal.vue b/src/components/modal/modal.vue
index e0722d65..d4fe9f76 100644
--- a/src/components/modal/modal.vue
+++ b/src/components/modal/modal.vue
@@ -1,8 +1,8 @@
 <template>
   <portal to="modal">
     <div
-      v-body-scroll-lock="isOpen"
       v-show="isOpen"
+      v-body-scroll-lock="isOpen"
       :class="['modal-view', viewClass]"
       @click.self="closeModal"
     >
-- 
cgit v1.2.3-70-g09d2

