From 2231025c41bef3618bd651ff7c0cacd39923d5e1 Mon Sep 17 00:00:00 2001
From: taehoon <th.dev91@gmail.com>
Date: Fri, 18 Oct 2019 07:08:34 -0400
Subject: fix eslint warning

---
 src/components/modal/modal.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/modal/modal.vue')

diff --git a/src/components/modal/modal.vue b/src/components/modal/modal.vue
index c0a7ab21..d47951c8 100644
--- a/src/components/modal/modal.vue
+++ b/src/components/modal/modal.vue
@@ -1,8 +1,8 @@
 <template>
   <div
     v-body-scroll-lock="true"
-    @click.self="closeModal"
     class="modal-view"
+    @click.self="closeModal"
   >
     <slot />
   </div>
-- 
cgit v1.2.3-70-g09d2

