From 7b99d98c553f40ec4d633d0d4fdf65f275c80e77 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Tue, 24 Nov 2020 12:32:42 +0200
Subject: Replace all use of <a> + href='#' with proper buttons

---
 src/components/mfa_form/totp_form.vue | 14 +++++++-------
 1 file changed, 7 insertions(+), 7 deletions(-)

(limited to 'src/components/mfa_form/totp_form.vue')

diff --git a/src/components/mfa_form/totp_form.vue b/src/components/mfa_form/totp_form.vue
index 9401cad5..79230148 100644
--- a/src/components/mfa_form/totp_form.vue
+++ b/src/components/mfa_form/totp_form.vue
@@ -25,23 +25,23 @@
         <div class="form-group">
           <div class="login-bottom">
             <div>
-              <a
-                href="#"
+              <button
+                class="button-unstyled -link"
                 @click.prevent="requireRecovery"
               >
                 {{ $t('login.enter_recovery_code') }}
-              </a>
+              </button>
               <br>
-              <a
-                href="#"
+              <button
+                class="button-unstyled -link"
                 @click.prevent="abortMFA"
               >
                 {{ $t('general.cancel') }}
-              </a>
+              </button>
             </div>
             <button
               type="submit"
-              class="btn btn-default"
+              class="btn button-default"
             >
               {{ $t('general.verify') }}
             </button>
-- 
cgit v1.2.3-70-g09d2

