From b25c0c6f0289541bf1d7ef52da7d09db2893d38d Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Tue, 19 Apr 2022 22:22:16 +0300
Subject: fix overflow that sometimes happens in sidebar due to too wide file
 upload element

---
 src/components/media_upload/media_upload.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/media_upload/media_upload.vue')

diff --git a/src/components/media_upload/media_upload.vue b/src/components/media_upload/media_upload.vue
index e955aa72..2920387e 100644
--- a/src/components/media_upload/media_upload.vue
+++ b/src/components/media_upload/media_upload.vue
@@ -19,7 +19,7 @@
       v-if="uploadReady"
       :disabled="disabled"
       type="file"
-      style="position: fixed; top: -100em"
+      style="position: fixed; top: -100em; max-width: 0; max-height: 0"
       multiple="true"
       @change="change"
     >
-- 
cgit v1.2.3-70-g09d2

