From 76727cd39cf588ffc1c15c0a2fd8f1ae30ada7ea Mon Sep 17 00:00:00 2001
From: Tusooa Zhu <tusooa@kazv.moe>
Date: Wed, 8 Sep 2021 21:28:29 -0400
Subject: Remove image box-shadow in media modal

The box-shadow causes an image to be very blurry on Webkit browsers
(experienced: Konqueror, Safari; heard of: Chrome) when scaled up
if the initial size of the image is much smaller than the actual size
(e.g. when viewing a very long picture).

The shadow is not really obvious anyway.
---
 src/components/media_modal/media_modal.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/components/media_modal/media_modal.vue')

diff --git a/src/components/media_modal/media_modal.vue b/src/components/media_modal/media_modal.vue
index 80ce1dea..0fbdb558 100644
--- a/src/components/media_modal/media_modal.vue
+++ b/src/components/media_modal/media_modal.vue
@@ -161,7 +161,6 @@
   max-height: 100%;
   min-width: 0;
   min-height: 0;
-  box-shadow: 0px 5px 15px 0 rgba(0, 0, 0, 0.5);
   image-orientation: from-image; // NOTE: only FF supports this
   animation: 0.1s cubic-bezier(0.7, 0, 1, 0.6) media-fadein;
 }
-- 
cgit v1.2.3-70-g09d2

