From f561e755530063b2e8e0db210264b1d244543bd0 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 21 Oct 2020 00:31:16 +0300
Subject: lint

---
 src/components/login_form/login_form.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/components/login_form/login_form.vue')

diff --git a/src/components/login_form/login_form.vue b/src/components/login_form/login_form.vue
index f6b767a2..4ab5d192 100644
--- a/src/components/login_form/login_form.vue
+++ b/src/components/login_form/login_form.vue
@@ -77,7 +77,8 @@
       <div class="alert error">
         {{ error }}
         <FAIcon
-          class="button-icon" icon="times"
+          class="button-icon"
+          icon="times"
           @click="clearError"
         />
       </div>
-- 
cgit v1.2.3-70-g09d2

