From c9ab70db8ea5163b2687adf93f6e3f414873df5d Mon Sep 17 00:00:00 2001
From: Roger Braun <roger@rogerbraun.net>
Date: Sat, 12 Nov 2016 21:31:41 +0100
Subject: Login form, post status form, status css fixes.

---
 src/components/login_form/login_form.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/login_form/login_form.vue')

diff --git a/src/components/login_form/login_form.vue b/src/components/login_form/login_form.vue
index 94fb885d..be1e970c 100644
--- a/src/components/login_form/login_form.vue
+++ b/src/components/login_form/login_form.vue
@@ -1,5 +1,5 @@
 <template>
-  <div class="panel panel-default">
+  <div class="login panel panel-default">
     <!-- Default panel contents -->
     <div class="panel-heading">
       Log in
-- 
cgit v1.2.3-70-g09d2

