From b6cf2bcefd5ddd20c11ee4b0d0f94e29e8f59c40 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 28 Oct 2020 21:31:16 +0200
Subject: improved the semantics for our icon scale, fixed preview, fixed
 navbar desktop

---
 src/components/login_form/login_form.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/login_form/login_form.vue')

diff --git a/src/components/login_form/login_form.vue b/src/components/login_form/login_form.vue
index 4ab5d192..a1f77210 100644
--- a/src/components/login_form/login_form.vue
+++ b/src/components/login_form/login_form.vue
@@ -77,7 +77,7 @@
       <div class="alert error">
         {{ error }}
         <FAIcon
-          class="button-icon"
+          class="fa-scale-110 fa-old-padding"
           icon="times"
           @click="clearError"
         />
-- 
cgit v1.2.3-70-g09d2

