From acdb5e5c7a2dac1908a5daafd94c31bc116a1799 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sun, 1 Apr 2018 05:28:20 +0300
Subject: cleanup. added fallback mechanism for IE11 and unsupported browsers.

---
 src/components/login_form/login_form.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/components/login_form/login_form.vue')

diff --git a/src/components/login_form/login_form.vue b/src/components/login_form/login_form.vue
index 553858a3..82000d6b 100644
--- a/src/components/login_form/login_form.vue
+++ b/src/components/login_form/login_form.vue
@@ -31,6 +31,7 @@
 <script src="./login_form.js" ></script>
 
 <style lang="scss">
+@import '../../_variables.scss';
 
 .login-form {
     input {
@@ -47,7 +48,7 @@
         border-radius: 5px;
         text-align: center;
         background-color: rgba(255, 48, 16, 0.65);
-        background-color: var(--cRed);
+       background-color: $fallback--cRed;
         min-height: 28px;
         line-height: 28px;
     }
-- 
cgit v1.2.3-70-g09d2

