From 95e6bccec5a3bb89ca6b1511f12eb0caf5a241a4 Mon Sep 17 00:00:00 2001
From: William Pitcock <nenolod@dereferenced.org>
Date: Mon, 20 Aug 2018 18:06:29 +0000
Subject: Revert "Unify button styles and use min-width"

This reverts commit 8f7919388391742671ef0398e017383d7f0b2bc5.
---
 src/components/login_form/login_form.vue | 5 +++++
 1 file changed, 5 insertions(+)

(limited to 'src/components/login_form/login_form.vue')

diff --git a/src/components/login_form/login_form.vue b/src/components/login_form/login_form.vue
index d2bdffcb..b7fed48a 100644
--- a/src/components/login_form/login_form.vue
+++ b/src/components/login_form/login_form.vue
@@ -34,6 +34,11 @@
 @import '../../_variables.scss';
 
 .login-form {
+  .btn {
+    min-height: 28px;
+    width: 10em;
+  }
+
   .error {
     text-align: center;
   }
-- 
cgit v1.2.3-70-g09d2

