From 142a8a1a76c1237078ef7ced163a4088638441ff Mon Sep 17 00:00:00 2001
From: shpuld <shpuld@gmail.com>
Date: Fri, 24 Feb 2017 19:43:27 +0200
Subject: Fix poor choice of colors for input/textarea borders, adjust login
 form padding.

---
 src/components/login_form/login_form.vue | 7 ++++---
 1 file changed, 4 insertions(+), 3 deletions(-)

(limited to 'src/components/login_form/login_form.vue')

diff --git a/src/components/login_form/login_form.vue b/src/components/login_form/login_form.vue
index 47495a48..c0ea4313 100644
--- a/src/components/login_form/login_form.vue
+++ b/src/components/login_form/login_form.vue
@@ -1,7 +1,7 @@
 <template>
   <div class="login panel panel-default base00-background">
     <!-- Default panel contents -->
-    <div class="panel-heading base01-background base04">
+    <div class="panel-heading base01-background">
       Log in
     </div>
     <div class="panel-body">
@@ -30,12 +30,13 @@
   input {
     border-width: 1px;
     border-style: solid;
+    border-color: silver;
     border-radius: 5px;
-    padding: 0.2em;
+    padding: 0.1em 0.2em 0.2em 0.2em;
   }
 
   .btn {
-    margin-top: 0.5em;
+    margin-top: 1.0em;
     min-height: 28px;
   }
 }
-- 
cgit v1.2.3-70-g09d2

