From 47b0b385f41d925d38642329937423cf0022865d Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 5 Dec 2018 11:37:01 +0300
Subject: Added user option to hide instance-specific panel, rearranged config
 screen to better categorize it / adjustments to language selector

---
 .../interface_language_switcher/interface_language_switcher.vue        | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'src/components/interface_language_switcher/interface_language_switcher.vue')

diff --git a/src/components/interface_language_switcher/interface_language_switcher.vue b/src/components/interface_language_switcher/interface_language_switcher.vue
index 4b541888..3f58af2c 100644
--- a/src/components/interface_language_switcher/interface_language_switcher.vue
+++ b/src/components/interface_language_switcher/interface_language_switcher.vue
@@ -1,5 +1,8 @@
 <template>
   <div>
+    <label for="interface-language-switcher">
+      {{ $t('settings.interfaceLanguage') }}
+    </label>
     <label for="interface-language-switcher" class='select'>
       <select id="interface-language-switcher" v-model="language">
         <option v-for="(langCode, i) in languageCodes" :value="langCode">
-- 
cgit v1.2.3-70-g09d2

