From c4f8426349baaa7e804182e455126c9353b08744 Mon Sep 17 00:00:00 2001
From: Shpuld Shpludson <shp@cock.li>
Date: Sat, 2 Mar 2019 16:35:38 +0000
Subject: Re-do status header a bit, add more consistent spacing to status

---
 src/components/gallery/gallery.vue | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'src/components/gallery/gallery.vue')

diff --git a/src/components/gallery/gallery.vue b/src/components/gallery/gallery.vue
index 3f90caa9..2366ddf7 100644
--- a/src/components/gallery/gallery.vue
+++ b/src/components/gallery/gallery.vue
@@ -36,6 +36,9 @@
     box-sizing: border-box;
     // to make failed images a bit more noticeable on chromium
     min-width: 2em;
+    &:last-child {
+      margin: 0;
+    }
   }
 
   .image-attachment {
-- 
cgit v1.2.3-70-g09d2

