From 020c6d1bcfaf67ccb9ecdab13a39a1ddea868bb6 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sun, 7 Jul 2019 00:54:17 +0300
Subject: all the manual fixes

---
 src/components/gallery/gallery.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/components/gallery/gallery.vue')

diff --git a/src/components/gallery/gallery.vue b/src/components/gallery/gallery.vue
index 577f2144..6adfb76c 100644
--- a/src/components/gallery/gallery.vue
+++ b/src/components/gallery/gallery.vue
@@ -4,7 +4,8 @@
     style="width: 100%;"
   >
     <div
-      v-for="row in rows"
+      v-for="(row, index) in rows"
+      :key="index"
       class="gallery-row"
       :style="rowHeight(row.length)"
       :class="{ 'contain-fit': useContainFit, 'cover-fit': !useContainFit }"
-- 
cgit v1.2.3-70-g09d2

