From 123913f34ffd91917a9ed4dd1c9d406fb547ef87 Mon Sep 17 00:00:00 2001
From: Tusooa Zhu <tusooa@kazv.moe>
Date: Sun, 15 Aug 2021 00:43:35 -0400
Subject: Optimise emoji picker loading process

---
 src/components/emoji_picker/emoji_picker.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/emoji_picker/emoji_picker.vue')

diff --git a/src/components/emoji_picker/emoji_picker.vue b/src/components/emoji_picker/emoji_picker.vue
index 277d5bf6..7b2b7fc8 100644
--- a/src/components/emoji_picker/emoji_picker.vue
+++ b/src/components/emoji_picker/emoji_picker.vue
@@ -3,7 +3,7 @@
     <div class="heading">
       <span class="emoji-tabs">
         <span
-          v-for="group in allEmojiGroups"
+          v-for="group in filteredEmojiGroups"
           :key="group.id"
           class="emoji-tabs-item"
           :class="{
@@ -67,7 +67,7 @@
           @scroll="onScroll"
         >
           <div
-            v-for="group in allEmojiGroups"
+            v-for="group in filteredEmojiGroups"
             :key="group.id"
             class="emoji-group"
           >
-- 
cgit v1.2.3-70-g09d2

