From 0a79a747730bb4a10eb2544412dab68a10602240 Mon Sep 17 00:00:00 2001
From: Tusooa Zhu <tusooa@kazv.moe>
Date: Mon, 29 Aug 2022 18:46:41 -0400
Subject: Use dedicated indicator for non-ascii domain names

---
 src/components/emoji_input/emoji_input.vue | 16 +++++++++++++++-
 1 file changed, 15 insertions(+), 1 deletion(-)

(limited to 'src/components/emoji_input/emoji_input.vue')

diff --git a/src/components/emoji_input/emoji_input.vue b/src/components/emoji_input/emoji_input.vue
index 7d95ab7e..81b81913 100644
--- a/src/components/emoji_input/emoji_input.vue
+++ b/src/components/emoji_input/emoji_input.vue
@@ -50,7 +50,21 @@
             <span v-else>{{ suggestion.replacement }}</span>
           </span>
           <div class="label">
-            <span class="displayText">{{ suggestion.displayText }}</span>
+            <span
+              v-if="suggestion.user"
+              class="displayText"
+            >
+              {{ suggestion.displayText }}<UnicodeDomainIndicator
+                :user="suggestion.user"
+                :at="false"
+              />
+            </span>
+            <span
+              v-if="!suggestion.user"
+              class="displayText"
+            >
+              {{ suggestion.displayText }}
+            </span>
             <span class="detailText">{{ suggestion.detailText }}</span>
           </div>
         </div>
-- 
cgit v1.2.3-70-g09d2

