From ce5552ae3c53b563126aae2c3c9b77a321880eed Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 6 Mar 2024 20:35:03 +0200
Subject: fix more transparent panels

---
 src/components/dialog_modal/dialog_modal.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/dialog_modal/dialog_modal.vue')

diff --git a/src/components/dialog_modal/dialog_modal.vue b/src/components/dialog_modal/dialog_modal.vue
index b917c637..3bceff22 100644
--- a/src/components/dialog_modal/dialog_modal.vue
+++ b/src/components/dialog_modal/dialog_modal.vue
@@ -12,7 +12,7 @@
           <slot name="header" />
         </div>
       </div>
-      <div class="dialog-modal-content">
+      <div class="panel-body dialog-modal-content">
         <slot name="default" />
       </div>
       <div class="dialog-modal-footer user-interactions panel-footer">
-- 
cgit v1.2.3-70-g09d2

