From 8f63bbb64fa2860e73d8562de9d6c62629a8668f Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 13 Jan 2020 00:33:04 +0200
Subject: poll slot renamed, lightBg customization implemented

---
 src/components/dialog_modal/dialog_modal.vue | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'src/components/dialog_modal/dialog_modal.vue')

diff --git a/src/components/dialog_modal/dialog_modal.vue b/src/components/dialog_modal/dialog_modal.vue
index 55d7a7d2..3241ce3e 100644
--- a/src/components/dialog_modal/dialog_modal.vue
+++ b/src/components/dialog_modal/dialog_modal.vue
@@ -75,18 +75,18 @@
   .dialog-modal-content {
     margin: 0;
     padding: 1rem 1rem;
-    background-color: $fallback--lightBg;
-    background-color: var(--lightBg, $fallback--lightBg);
+    background-color: $fallback--bg;
+    background-color: var(--bg, $fallback--bg);
     white-space: normal;
   }
 
   .dialog-modal-footer {
     margin: 0;
     padding: .5em .5em;
-    background-color: $fallback--lightBg;
-    background-color: var(--lightBg, $fallback--lightBg);
-    border-top: 1px solid $fallback--bg;
-    border-top: 1px solid var(--bg, $fallback--bg);
+    background-color: $fallback--bg;
+    background-color: var(--bg, $fallback--bg);
+    border-top: 1px solid $fallback--border;
+    border-top: 1px solid var(--border, $fallback--border);
     display: flex;
     justify-content: flex-end;
 
-- 
cgit v1.2.3-70-g09d2

