From 91c4a57fe50fae8b6e8defe08f09c8a7090bf649 Mon Sep 17 00:00:00 2001
From: Tusooa Zhu <tusooa@kazv.moe>
Date: Sat, 9 Apr 2022 23:11:19 -0400
Subject: Make page unscrollable when confirm modal is shown

Or we could scroll until the component is ... hidden
due to virtual-scrolling, and the modal disappears!
---
 src/components/confirm_modal/confirm_modal.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/confirm_modal/confirm_modal.vue')

diff --git a/src/components/confirm_modal/confirm_modal.vue b/src/components/confirm_modal/confirm_modal.vue
index 5b5014c5..1ac64b62 100644
--- a/src/components/confirm_modal/confirm_modal.vue
+++ b/src/components/confirm_modal/confirm_modal.vue
@@ -1,5 +1,6 @@
 <template>
   <dialog-modal
+    v-body-scroll-lock="true"
     class="confirm-modal"
     :on-cancel="onCancel"
   >
-- 
cgit v1.2.3-70-g09d2

