From c1478b0887bc09dc668dc160c52f761c920f9186 Mon Sep 17 00:00:00 2001
From: taehoon <th.dev91@gmail.com>
Date: Fri, 8 Nov 2019 11:14:01 -0500
Subject: fix eslint warnings

---
 src/components/checkbox/checkbox.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/checkbox/checkbox.vue')

diff --git a/src/components/checkbox/checkbox.vue b/src/components/checkbox/checkbox.vue
index 5917598a..1113f81d 100644
--- a/src/components/checkbox/checkbox.vue
+++ b/src/components/checkbox/checkbox.vue
@@ -12,8 +12,8 @@
     >
     <i class="checkbox-indicator" />
     <span
-      class="label"
       v-if="!!$slots.default"
+      class="label"
     >
       <slot />
     </span>
-- 
cgit v1.2.3-70-g09d2

