From 8d6750d9c2816e33a0444cd978f94009d8b85d47 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Fri, 5 Jul 2019 10:17:44 +0300
Subject: eslint --fix --ext .js,.vue src

---
 src/components/checkbox/checkbox.vue | 9 +++++++--
 1 file changed, 7 insertions(+), 2 deletions(-)

(limited to 'src/components/checkbox/checkbox.vue')

diff --git a/src/components/checkbox/checkbox.vue b/src/components/checkbox/checkbox.vue
index 4152b049..2b822ec3 100644
--- a/src/components/checkbox/checkbox.vue
+++ b/src/components/checkbox/checkbox.vue
@@ -1,8 +1,13 @@
 <template>
   <label class="checkbox">
-    <input type="checkbox" :checked="checked" @change="$emit('change', $event.target.checked)" :indeterminate.prop="indeterminate">
+    <input
+      type="checkbox"
+      :checked="checked"
+      :indeterminate.prop="indeterminate"
+      @change="$emit('change', $event.target.checked)"
+    >
     <i class="checkbox-indicator" />
-    <span v-if="!!$slots.default"><slot></slot></span>
+    <span v-if="!!$slots.default"><slot /></span>
   </label>
 </template>
 
-- 
cgit v1.2.3-70-g09d2

