From fc1283da834f4e2864c02fe8eb824b1c918d0710 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Sun, 15 Apr 2018 16:45:05 +0300
Subject: fixed nsfw hider having very small height, some border-radii for
 consistency

---
 src/components/attachment/attachment.vue | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'src/components/attachment/attachment.vue')

diff --git a/src/components/attachment/attachment.vue b/src/components/attachment/attachment.vue
index b2f63668..c48fb16b 100644
--- a/src/components/attachment/attachment.vue
+++ b/src/components/attachment/attachment.vue
@@ -96,6 +96,9 @@
     background: rgba(230,230,230,0.6);
     font-weight: bold;
     z-index: 4;
+    line-height: 1;
+    border-radius: $fallback--tooltipRadius;
+    border-radius: var(--tooltipRadius, $fallback--tooltipRadius);
   }
 
   .small {
-- 
cgit v1.2.3-70-g09d2

