From 6c631016c6719b811d48b05e32601578e150ba13 Mon Sep 17 00:00:00 2001
From: Roger Braun <roger@rogerbraun.net>
Date: Fri, 17 Feb 2017 10:20:12 +0100
Subject: One more small visual fix to oembeds.

---
 src/components/attachment/attachment.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/attachment/attachment.vue')

diff --git a/src/components/attachment/attachment.vue b/src/components/attachment/attachment.vue
index 94e88d52..a9dbecd9 100644
--- a/src/components/attachment/attachment.vue
+++ b/src/components/attachment/attachment.vue
@@ -43,6 +43,7 @@
           align-self: flex-start;
 
           &.html {
+            border: 1px solid;
             flex-basis: 100%;
           }
 
-- 
cgit v1.2.3-70-g09d2

