From 2147807fa011119115c0d574ed1b46356d01da09 Mon Sep 17 00:00:00 2001
From: Roger Braun <roger@rogerbraun.net>
Date: Tue, 22 Nov 2016 15:44:45 +0100
Subject: Add image height css back in.

Without it, Chrome stretches the image...
---
 src/components/attachment/attachment.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/attachment/attachment.vue')

diff --git a/src/components/attachment/attachment.vue b/src/components/attachment/attachment.vue
index ea517c9e..0e2a228a 100644
--- a/src/components/attachment/attachment.vue
+++ b/src/components/attachment/attachment.vue
@@ -95,6 +95,7 @@
                   border: 1px solid;
                   border-radius: 0.5em;
                   width: 100%;
+                  height: 100%; /* If this isn't here, chrome will stretch the images */
               }
           }
       }
-- 
cgit v1.2.3-70-g09d2

