From 5db77c839bcf2ec433c8618c5b2ef1ff850df613 Mon Sep 17 00:00:00 2001
From: Ariadne Conill <ariadne@dereferenced.org>
Date: Fri, 8 Nov 2019 21:57:09 -0600
Subject: about page: fix hiding of instance-specific panel, flow ToS and ISP
 better

---
 src/components/about/about.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/about/about.vue')

diff --git a/src/components/about/about.vue b/src/components/about/about.vue
index 62ae16ea..10dad4bb 100644
--- a/src/components/about/about.vue
+++ b/src/components/about/about.vue
@@ -1,8 +1,8 @@
 <template>
   <div class="sidebar">
-    <instance-specific-panel />
-    <features-panel v-if="showFeaturesPanel" />
+    <instance-specific-panel v-if="showInstanceSpecificPanel" />
     <terms-of-service-panel />
+    <features-panel v-if="showFeaturesPanel" />
   </div>
 </template>
 
-- 
cgit v1.2.3-70-g09d2

