From b6cf2bcefd5ddd20c11ee4b0d0f94e29e8f59c40 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Wed, 28 Oct 2020 21:31:16 +0200
Subject: improved the semantics for our icon scale, fixed preview, fixed
 navbar desktop

---
 src/App.vue | 9 +++------
 1 file changed, 3 insertions(+), 6 deletions(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index c27f51bf..6e44c7e9 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -53,8 +53,7 @@
           >
             <FAIcon
               fixed-width
-              size="lg"
-              class="button-icon"
+              class="fa-scale-110 fa-old-padding"
               icon="cog"
               :title="$t('nav.preferences')"
             />
@@ -66,8 +65,7 @@
             target="_blank"
           ><FAIcon
             fixed-width
-            size="lg"
-            class="button-icon"
+            class="fa-scale-110 fa-old-padding"
             icon="tachometer-alt"
             :title="$t('nav.administration')"
           /></a>
@@ -78,8 +76,7 @@
             @click.prevent="logout"
           ><FAIcon
             fixed-width
-            size="lg"
-            class="button-icon"
+            class="fa-scale-110 fa-old-padding"
             icon="sign-out-alt"
             :title="$t('login.logout')"
           /></a>
-- 
cgit v1.2.3-70-g09d2

