From 71863061c691df7f59cf4be283a3e0772d485378 Mon Sep 17 00:00:00 2001
From: Henry Jameson <me@hjkos.com>
Date: Mon, 4 Apr 2022 19:41:09 +0300
Subject: fixed tons of stuff, at least it looks normalish on desktop

---
 src/App.vue | 14 +++++++-------
 1 file changed, 7 insertions(+), 7 deletions(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index dc2359f3..71de2a36 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -7,28 +7,28 @@
       id="app_bg_wrapper"
       class="app-bg-wrapper"
     />
-    <MobileNav class="navbar" v-if="isMobileLayout" />
-    <DesktopNav class="navbar" v-else />
-    <div class="app-bg-wrapper app-container-wrapper" />
+    <MobileNav v-if="isMobileLayout" />
+    <DesktopNav v-else />
     <div
       id="content"
       class="app-layout container"
+      :class="{ '-reverse': reverseLayout }"
     >
       <div class="underlay"/>
       <div
+        id="sidebar"
         class="column -scrollable -mini mobile-hidden"
-        :style="sidebarAlign"
       >
         <user-panel />
-        <div v-if="!isMobileLayout">
+        <template v-if="!isMobileLayout">
           <nav-panel />
           <instance-specific-panel v-if="showInstanceSpecificPanel" />
           <features-panel v-if="!currentUser && showFeaturesPanel" />
           <who-to-follow-panel v-if="currentUser && suggestionsEnabled" />
           <notifications v-if="currentUser" />
-        </div>
+        </template>
       </div>
-      <div class="column main">
+      <div id="main-scroller" class="column main">
         <div
           v-if="!currentUser"
           class="login-hint panel panel-default"
-- 
cgit v1.2.3-70-g09d2

