From 191bbe76a83123b5d63ec07af00723721552ddd7 Mon Sep 17 00:00:00 2001
From: shpuld <shp@cock.li>
Date: Wed, 8 Nov 2017 12:34:15 +0200
Subject: Add a bunch of missed localization strings, update english and
 finnish to match.

---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index 48cf9ea6..479358b2 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -8,7 +8,7 @@
         <div class='item right'>
           <user-finder></user-finder>
           <router-link :to="{ name: 'settings'}"><i class="icon-cog"></i></router-link>
-          <a href="#" v-if="currentUser" @click.prevent="logout"><i class="icon-logout" title="Logout" ></i></a>
+          <a href="#" v-if="currentUser" @click.prevent="logout"><i class="icon-logout" :title="$t('login.logout')" ></i></a>
         </div>
       </div>
     </nav>
-- 
cgit v1.2.3-70-g09d2

