From 187c4a7d57fa359abc954b4fa9c570635fa149fd Mon Sep 17 00:00:00 2001
From: Roger Braun <roger@rogerbraun.net>
Date: Fri, 2 Dec 2016 14:33:03 +0100
Subject: CSS fixes.

---
 src/App.vue | 12 +++++++-----
 1 file changed, 7 insertions(+), 5 deletions(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index e46419e0..2cd6d079 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -6,14 +6,16 @@
       </div>
     </nav>
     <div class="container" id="content">
-      <sidebar>
+      <div class="sidebar">
         <user-panel></user-panel>
         <nav-panel></nav-panel>
         <notifications v-if="currentUser"></notifications>
-      </sidebar>
-      <transition name="fade">
-        <router-view></router-view>
-      </transition>
+      </div>
+      <div class="main">
+        <transition name="fade">
+          <router-view></router-view>
+        </transition>
+      </div>
     </div>
   </div>
 </template>
-- 
cgit v1.2.3-70-g09d2

