From 1293bec77e5137acf64d3536c286f8ba3df284f4 Mon Sep 17 00:00:00 2001
From: Shpuld Shpuldson <shp@cock.li>
Date: Thu, 2 Jul 2020 10:40:41 +0300
Subject: change storage error one-off into a global notice system

---
 src/App.vue | 11 +----------
 1 file changed, 1 insertion(+), 10 deletions(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index 23991eac..03b632ec 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -101,16 +101,6 @@
         </div>
       </div>
       <div class="main">
-        <div
-          v-if="showStorageError"
-          class="alert error storage-error-notice"
-        >
-          {{ $t("errors.storage_unavailable") }}
-          <i
-            class="icon-cancel"
-            @click="hideStorageError"
-          />
-        </div>
         <div
           v-if="!currentUser"
           class="login-hint panel panel-default"
@@ -138,6 +128,7 @@
     <PostStatusModal />
     <SettingsModal />
     <portal-target name="modal" />
+    <GlobalNoticeList />
   </div>
 </template>
 
-- 
cgit v1.2.3-70-g09d2

