From 0a3ce9cc8b44082557429ee0bc5372376f1b820a Mon Sep 17 00:00:00 2001
From: Eris <femmediscord@gmail.com>
Date: Mon, 14 Jun 2021 20:33:51 +0000
Subject: Don't shorten shoutbox to SB

---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index 39decde9..c30f5e98 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -50,7 +50,7 @@
       <media-modal />
     </div>
     <shout-panel
-      v-if="currentUser && shout && !hideSB"
+      v-if="currentUser && shout && !hideShoutbox"
       :floating="true"
       class="floating-shout mobile-hidden"
     />
-- 
cgit v1.2.3-70-g09d2

